Comment.Math.Univ.Carolin. 49,3 (2008)523–523 523

Corrigendum to “Positive solutions for systems of generalized three-point nonlinear boundary value problems”

J. Henderson, S.K. Ntouyas, I.K.Purnaras

On page 82 in the definition of L_1 and in the second and third line of page 83, γ should be replaced by γ^2. In the numerators of the last displayed relations on page 84 γ should be replaced by γη. On pages 82 and 84, min_{t∈[η,1]} should be replaced by min_{t∈[0,1]}. From relation (10) and so forth 1 − β should be replaced by 1 + β. In Example 1, k = 500, c = 1000 should be replaced by k = 6000, c = 12000 and L_1 ≃ 0, 972, L_2 ≃ 24.048 should be replaced by L_1 ≃ 1, 053, L_2 ≃ 15.0025 respectively.

References

[1] Henderson J., Ntouyas S.K., Purnaras I.K., Positive solutions for systems of generalized three-point nonlinear boundary value problems, Comment. Math. Univ. Carolin. 49 (2008), no. 1, 79–91.

Department of Mathematics, Baylor University, Waco, TX 76798-7328, USA E-mail: Johnny Henderson@baylor.edu

Department of Mathematics, University of Ioannina, 451 10 Ioannina, Greece E-mail: sntouyas@cc.uoi.gr

Department of Mathematics, University of Ioannina, 451 10 Ioannina, Greece E-mail: ipurnara@cc.uoi.gr

(Received February 18, 2008)